0 2 4 6 8 10 12 14 16 18 20 22 24

-517.2

-517.1

-517

-516.9

-516.8

Hx (nT)

VELIES, from 15-Oct-2012 06:47:48 to 15-Oct-2012 23:59:59

0 2 4 6 8 10 12 14 16 18 20 22 24

1050

1100

1150

1200

Hy (nT)

0 2 4 6 8 10 12 14 16 18 20 22 24

-513.4

-513.38

-513.36

-513.34

Time (hours)

Hz (nT)