0 2 4 6 8 10 12 14 16 18 20 22 24

-392

-391

-390

-389

Hx (nT)

VELIES, from 14-Oct-2012 00:00:00 to 14-Oct-2012 17:51:22

0 2 4 6 8 10 12 14 16 18 20 22 24

1150

1200

1250

Hy (nT)

0 2 4 6 8 10 12 14 16 18 20 22 24

-515

-510

-505

-500

Time (hours)

Hz (nT)