0 2 4 6 8 10 12 14 16 18 20 22 24

2.68

2.685

2.69

2.695 2.7 2.705 x 10^4

Hx (nT)

VELIES, from 10-Jul-2012 00:00:00 to 10-Jul-2012 23:59:59

0 2 4 6 8 10 12 14 16 18 20 22 24

1160

1180

1200

1220

1240

Hy (nT)

0 2 4 6 8 10 12 14 16 18 20 22 24

3.612

3.614

3.616

3.618

3.62

3.622 x 10^4

Time (hours)

Hz (nT)