0 2 4 6 8 10 12 14 16 18 20 22 24

2.692

2.694

2.696

2.698 2.7 x 10^4

Hx (nT)

VELIES, from 23-Sep-2011 11:54:09 to 23-Sep-2011 23:59:59

0 2 4 6 8 10 12 14 16 18 20 22 24

1120

1140

1160

1180

Hy (nT)

0 2 4 6 8 10 12 14 16 18 20 22 24

3.614

3.615

3.616

3.617 x 10^4

Time (hours)

Hz (nT)