0 2 4 6 8 10 12 14 16 18 20 22 24

2.698 2.7 2.702

2.704 x 10^4

Hx (nT)

VELIES, from 23-Mar-2010 00:00:00 to 23-Mar-2010 23:59:59

0 2 4 6 8 10 12 14 16 18 20 22 24

1040

1060

1080

1100

Hy (nT)

0 2 4 6 8 10 12 14 16 18 20 22 24

3.603

3.604

3.605

3.606

3.607 x 10^4

Time (hours)

Hz (nT)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.5

1

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.5

1